<p>[vc_row full_width="stretch_row" full_height="yes" columns_placement="stretch" equal_height="yes" mobile_bg_img_hidden="no" tablet_bg_img_hidden="no" woodmart_parallax="0" woodmart_gradient_switch="no" row_reverse_mobile="0" row_reverse_tablet="0" woodmart_disable_overflow="0" css=".vc_custom_1623586369813{background-image: url(https://naty-insulation.co.il/wp-content/uploads/2021/06/long-shot-man-working-roof.jpg?id=3682) !important;background-position: center !important;background-repeat: no-repeat !important;background-size: cover !important;}"][vc_column width="1/2"][/vc_column][vc_column width="1/2" css=".vc_custom_1623586341106{background-color: rgba(255,255,255,0.52) !important;*background-color: rgb(255,255,255) !important;}" mobile_bg_img_hidden="no" tablet_bg_img_hidden="no" woodmart_parallax="0" woodmart_sticky_column="false" parallax_scroll="no" mobile_reset_margin="no" tablet_reset_margin="no"][woodmart_title font_weight="700" woodmart_css_id="60c5f5e731f28" title="מי אנחנו" title_font_size="eyJwYXJhbV90eXBlIjoid29vZG1hcnRfcmVzcG9uc2l2ZV9zaXplIiwiY3NzX2FyZ3MiOnsiZm9udC1zaXplIjpbIiAud29vZG1hcnQtdGl0bGUtY29udGFpbmVyIl19LCJzZWxlY3Rvcl9pZCI6IjYwYzVmNWU3MzFmMjgiLCJkYXRhIjp7ImRlc2t0b3AiOiI3OHB4In19" title_custom_color="eyJwYXJhbV90eXBlIjoid29vZG1hcnRfY29sb3JwaWNrZXIiLCJjc3NfYXJncyI6eyJjb2xvciI6WyIgLndvb2RtYXJ0LXRpdGxlLWNvbnRhaW5lciJdfSwic2VsZWN0b3JfaWQiOiI2MGM1ZjVlNzMxZjI4IiwiZGF0YSI6eyJkZXNrdG9wIjoiI2ZmZmZmZiJ9fQ==" title_width="100"][/vc_column][/vc_row][vc_row disable_element="yes" mobile_bg_img_hidden="no" tablet_bg_img_hidden="no" woodmart_parallax="0" woodmart_gradient_switch="no" row_reverse_mobile="0" row_reverse_tablet="0" woodmart_disable_overflow="0"][vc_column][rev_slider slidertitle="main-slider" alias="main-slider"][/vc_column][/vc_row][vc_row full_width="stretch_row" full_height="yes" disable_element="yes" mobile_bg_img_hidden="no" tablet_bg_img_hidden="no" woodmart_parallax="0" woodmart_gradient_switch="no" row_reverse_mobile="0" row_reverse_tablet="0" woodmart_disable_overflow="0" el_class="fp-row-video-bg" css=".vc_custom_1623584153790{background-position: center !important;background-repeat: no-repeat !important;background-size: cover !important;}"][vc_column mobile_bg_img_hidden="no" tablet_bg_img_hidden="no" woodmart_parallax="0" woodmart_sticky_column="false" el_class="text-main-slide" parallax_scroll="no" mobile_reset_margin="no" tablet_reset_margin="no"][vc_row_inner el_class="textOnMainSlide" row_reverse_mobile="0" row_reverse_tablet="0"][vc_column_inner][woodmart_title tag="h1" woodmart_css_id="60745f0616d0a" title="סלוגן מומחים לאיטום 1" title_font_size="eyJwYXJhbV90eXBlIjoid29vZG1hcnRfcmVzcG9uc2l2ZV9zaXplIiwiY3NzX2FyZ3MiOnsiZm9udC1zaXplIjpbIiAud29vZG1hcnQtdGl0bGUtY29udGFpbmVyIl19LCJzZWxlY3Rvcl9pZCI6IjYwNzQ1ZjA2MTZkMGEiLCJkYXRhIjp7ImRlc2t0b3AiOiI0MXB4IiwidGFibGV0IjoiMzZweCIsIm1vYmlsZSI6IjI4cHgifX0=" title_line_height="eyJwYXJhbV90eXBlIjoid29vZG1hcnRfcmVzcG9uc2l2ZV9zaXplIiwiY3NzX2FyZ3MiOnsibGluZS1oZWlnaHQiOlsiIC53b29kbWFydC10aXRsZS1jb250YWluZXIiXX0sInNlbGVjdG9yX2lkIjoiNjA3NDVmMDYxNmQwYSIsImRhdGEiOnsiZGVza3RvcCI6IjQxcHgiLCJ0YWJsZXQiOiIzNnB4IiwibW9iaWxlIjoiMjhweCJ9fQ==" title_custom_color="eyJwYXJhbV90eXBlIjoid29vZG1hcnRfY29sb3JwaWNrZXIiLCJjc3NfYXJncyI6eyJjb2xvciI6WyIgLndvb2RtYXJ0LXRpdGxlLWNvbnRhaW5lciJdfSwic2VsZWN0b3JfaWQiOiI2MDc0NWYwNjE2ZDBhIiwiZGF0YSI6eyJkZXNrdG9wIjoiI2ZmZmZmZiJ9fQ==" title_width="100" css=".vc_custom_1618239253571{margin-bottom: 55px !important;}" el_class="textContent maintext item-1"][woodmart_title tag="h1" woodmart_css_id="60745f16e8129" title="סלוגן מומחים לאיטום 2" title_font_size="eyJwYXJhbV90eXBlIjoid29vZG1hcnRfcmVzcG9uc2l2ZV9zaXplIiwiY3NzX2FyZ3MiOnsiZm9udC1zaXplIjpbIiAud29vZG1hcnQtdGl0bGUtY29udGFpbmVyIl19LCJzZWxlY3Rvcl9pZCI6IjYwNzQ1ZjE2ZTgxMjkiLCJkYXRhIjp7ImRlc2t0b3AiOiI0MXB4IiwidGFibGV0IjoiMzZweCIsIm1vYmlsZSI6IjI4cHgifX0=" title_line_height="eyJwYXJhbV90eXBlIjoid29vZG1hcnRfcmVzcG9uc2l2ZV9zaXplIiwiY3NzX2FyZ3MiOnsibGluZS1oZWlnaHQiOlsiIC53b29kbWFydC10aXRsZS1jb250YWluZXIiXX0sInNlbGVjdG9yX2lkIjoiNjA3NDVmMTZlODEyOSIsImRhdGEiOnsiZGVza3RvcCI6IjQxcHgiLCJ0YWJsZXQiOiIzNnB4IiwibW9iaWxlIjoiMjhweCJ9fQ==" title_custom_color="eyJwYXJhbV90eXBlIjoid29vZG1hcnRfY29sb3JwaWNrZXIiLCJjc3NfYXJncyI6eyJjb2xvciI6WyIgLndvb2RtYXJ0LXRpdGxlLWNvbnRhaW5lciJdfSwic2VsZWN0b3JfaWQiOiI2MDc0NWYxNmU4MTI5IiwiZGF0YSI6eyJkZXNrdG9wIjoiI2ZmZmZmZiJ9fQ==" title_width="100" css=".vc_custom_1618239261787{margin-bottom: 55px !important;}" el_class="textContent item-2"][woodmart_title tag="h1" woodmart_css_id="60745f1f7f999" title="סלוגן מומחים לאיטום 3" title_font_size="eyJwYXJhbV90eXBlIjoid29vZG1hcnRfcmVzcG9uc2l2ZV9zaXplIiwiY3NzX2FyZ3MiOnsiZm9udC1zaXplIjpbIiAud29vZG1hcnQtdGl0bGUtY29udGFpbmVyIl19LCJzZWxlY3Rvcl9pZCI6IjYwNzQ1ZjFmN2Y5OTkiLCJkYXRhIjp7ImRlc2t0b3AiOiI0MXB4IiwidGFibGV0IjoiMzZweCIsIm1vYmlsZSI6IjI4cHgifX0=" title_line_height="eyJwYXJhbV90eXBlIjoid29vZG1hcnRfcmVzcG9uc2l2ZV9zaXplIiwiY3NzX2FyZ3MiOnsibGluZS1oZWlnaHQiOlsiIC53b29kbWFydC10aXRsZS1jb250YWluZXIiXX0sInNlbGVjdG9yX2lkIjoiNjA3NDVmMWY3Zjk5OSIsImRhdGEiOnsiZGVza3RvcCI6IjQxcHgiLCJ0YWJsZXQiOiIzNnB4IiwibW9iaWxlIjoiMjhweCJ9fQ==" title_custom_color="eyJwYXJhbV90eXBlIjoid29vZG1hcnRfY29sb3JwaWNrZXIiLCJjc3NfYXJncyI6eyJjb2xvciI6WyIgLndvb2RtYXJ0LXRpdGxlLWNvbnRhaW5lciJdfSwic2VsZWN0b3JfaWQiOiI2MDc0NWYxZjdmOTk5IiwiZGF0YSI6eyJkZXNrdG9wIjoiI2ZmZmZmZiJ9fQ==" title_width="100" css=".vc_custom_1618239269835{margin-bottom: 55px !important;}" el_class="textContent item-3"][woodmart_title tag="h1" woodmart_css_id="60745f2a48778" title="סלוגן מומחים לאיטום 4" title_font_size="eyJwYXJhbV90eXBlIjoid29vZG1hcnRfcmVzcG9uc2l2ZV9zaXplIiwiY3NzX2FyZ3MiOnsiZm9udC1zaXplIjpbIiAud29vZG1hcnQtdGl0bGUtY29udGFpbmVyIl19LCJzZWxlY3Rvcl9pZCI6IjYwNzQ1ZjJhNDg3NzgiLCJkYXRhIjp7ImRlc2t0b3AiOiI0MXB4IiwidGFibGV0IjoiMzZweCIsIm1vYmlsZSI6IjI4cHgifX0=" title_line_height="eyJwYXJhbV90eXBlIjoid29vZG1hcnRfcmVzcG9uc2l2ZV9zaXplIiwiY3NzX2FyZ3MiOnsibGluZS1oZWlnaHQiOlsiIC53b29kbWFydC10aXRsZS1jb250YWluZXIiXX0sInNlbGVjdG9yX2lkIjoiNjA3NDVmMmE0ODc3OCIsImRhdGEiOnsiZGVza3RvcCI6IjQxcHgiLCJ0YWJsZXQiOiIzNnB4IiwibW9iaWxlIjoiMjhweCJ9fQ==" title_custom_color="eyJwYXJhbV90eXBlIjoid29vZG1hcnRfY29sb3JwaWNrZXIiLCJjc3NfYXJncyI6eyJjb2xvciI6WyIgLndvb2RtYXJ0LXRpdGxlLWNvbnRhaW5lciJdfSwic2VsZWN0b3JfaWQiOiI2MDc0NWYyYTQ4Nzc4IiwiZGF0YSI6eyJkZXNrdG9wIjoiI2ZmZmZmZiJ9fQ==" title_width="100" css=".vc_custom_1618239280882{margin-bottom: 55px !important;}" el_class="textContent item-4"][vc_single_image image="2524" img_size="full" alignment="center" el_class="scroll-dwn" parallax_scroll="no" css=".vc_custom_1615476445082{margin-bottom: 0px !important;}"][/vc_column_inner][/vc_row_inner][/vc_column][/vc_row][vc_row full_width="stretch_row_content" mcw_fp_auto_height="on" mobile_bg_img_hidden="no" tablet_bg_img_hidden="no" woodmart_parallax="0" woodmart_gradient_switch="no" row_reverse_mobile="0" row_reverse_tablet="0" woodmart_disable_overflow="0"][vc_column css=".vc_custom_1619076916482{padding-top: 0px !important;}" mobile_bg_img_hidden="no" tablet_bg_img_hidden="no" woodmart_parallax="0" woodmart_sticky_column="false" parallax_scroll="no" mobile_reset_margin="no" tablet_reset_margin="no"][vc_raw_html css=".vc_custom_1619076481450{margin-bottom: 0px !important;}"]JTVCaHRtbF9ibG9jayUyMGlkJTNEJTIyMjc5NiUyMiU1RA==[/vc_raw_html][/vc_column][/vc_row][vc_row full_width="stretch_row" css=".vc_custom_1619338069636{background-image: url(https://naty-insulation.co.il/wp-content/uploads/2021/04/b92ebc8e-3907-4b7d-b147-0f40b9ea4aaf.jpg?id=3570) !important;background-position: center !important;background-repeat: no-repeat !important;background-size: cover !important;}" mobile_bg_img_hidden="no" tablet_bg_img_hidden="no" woodmart_parallax="0" woodmart_gradient_switch="no" row_reverse_mobile="0" row_reverse_tablet="0" woodmart_disable_overflow="0" el_class="row-mobhand"][vc_column width="1/2"][vc_row_inner][vc_column_inner width="1/2"][woodmart_info_box image="2545" alignment="center" title_tag="div" title_font_weight="800" woodmart_css_id="6087a2d77df84" title="שירות בווצאפ" title_font_size="eyJwYXJhbV90eXBlIjoid29vZG1hcnRfcmVzcG9uc2l2ZV9zaXplIiwiY3NzX2FyZ3MiOnsiZm9udC1zaXplIjpbIiAuaW5mby1ib3gtdGl0bGUiXX0sInNlbGVjdG9yX2lkIjoiNjA4N2EyZDc3ZGY4NCIsImRhdGEiOnsiZGVza3RvcCI6IjI2cHgiLCJ0YWJsZXQiOiIyMXB4IiwibW9iaWxlIjoiMThweCJ9fQ==" title_color="eyJwYXJhbV90eXBlIjoid29vZG1hcnRfY29sb3JwaWNrZXIiLCJjc3NfYXJncyI6eyJjb2xvciI6WyIgLmluZm8tYm94LXRpdGxlIl19LCJzZWxlY3Rvcl9pZCI6IjYwODdhMmQ3N2RmODQiLCJkYXRhIjp7ImRlc2t0b3AiOiIjMjYyYzQ5In19" svg_animation="no" info_box_inline="no" el_class="ib-soc" link="url:https%3A%2F%2Fwa.me%2F972503471751"][/woodmart_info_box][/vc_column_inner][vc_column_inner width="1/2"][woodmart_info_box image="2546" alignment="center" title_tag="div" title_font_weight="800" woodmart_css_id="6087a2c8aa320" title="יתרון 1" title_font_size="eyJwYXJhbV90eXBlIjoid29vZG1hcnRfcmVzcG9uc2l2ZV9zaXplIiwiY3NzX2FyZ3MiOnsiZm9udC1zaXplIjpbIiAuaW5mby1ib3gtdGl0bGUiXX0sInNlbGVjdG9yX2lkIjoiNjA4N2EyYzhhYTMyMCIsImRhdGEiOnsiZGVza3RvcCI6IjI2cHgiLCJ0YWJsZXQiOiIyMXB4IiwibW9iaWxlIjoiMThweCJ9fQ==" title_color="eyJwYXJhbV90eXBlIjoid29vZG1hcnRfY29sb3JwaWNrZXIiLCJjc3NfYXJncyI6eyJjb2xvciI6WyIgLmluZm8tYm94LXRpdGxlIl19LCJzZWxlY3Rvcl9pZCI6IjYwODdhMmM4YWEzMjAiLCJkYXRhIjp7ImRlc2t0b3AiOiIjMjYyYzQ5In19" svg_animation="no" info_box_inline="no" el_class="ib-soc"][/woodmart_info_box][/vc_column_inner][/vc_row_inner][vc_row_inner css=".vc_custom_1610982851048{margin-bottom: 50px !important;}" row_reverse_mobile="0" row_reverse_tablet="0"][vc_column_inner width="1/2"][woodmart_info_box image="2541" alignment="center" title_tag="div" title_font_weight="800" woodmart_css_id="6087a2ff96df1" title="שירות אונליין" title_font_size="eyJwYXJhbV90eXBlIjoid29vZG1hcnRfcmVzcG9uc2l2ZV9zaXplIiwiY3NzX2FyZ3MiOnsiZm9udC1zaXplIjpbIiAuaW5mby1ib3gtdGl0bGUiXX0sInNlbGVjdG9yX2lkIjoiNjA4N2EyZmY5NmRmMSIsImRhdGEiOnsiZGVza3RvcCI6IjI2cHgiLCJ0YWJsZXQiOiIyMXB4IiwibW9iaWxlIjoiMThweCJ9fQ==" title_color="eyJwYXJhbV90eXBlIjoid29vZG1hcnRfY29sb3JwaWNrZXIiLCJjc3NfYXJncyI6eyJjb2xvciI6WyIgLmluZm8tYm94LXRpdGxlIl19LCJzZWxlY3Rvcl9pZCI6IjYwODdhMmZmOTZkZjEiLCJkYXRhIjp7ImRlc2t0b3AiOiIjMjYyYzQ5In19" svg_animation="no" info_box_inline="no" el_class="ib-soc"][/woodmart_info_box][/vc_column_inner][vc_column_inner width="1/2"][woodmart_info_box image="2542" alignment="center" title_tag="div" title_font_weight="800" woodmart_css_id="608524031a35c" title="מענה אלקטרוני במייל" title_font_size="eyJwYXJhbV90eXBlIjoid29vZG1hcnRfcmVzcG9uc2l2ZV9zaXplIiwiY3NzX2FyZ3MiOnsiZm9udC1zaXplIjpbIiAuaW5mby1ib3gtdGl0bGUiXX0sInNlbGVjdG9yX2lkIjoiNjA4NTI0MDMxYTM1YyIsImRhdGEiOnsiZGVza3RvcCI6IjI2cHgiLCJ0YWJsZXQiOiIyMXB4IiwibW9iaWxlIjoiMThweCJ9fQ==" title_color="eyJwYXJhbV90eXBlIjoid29vZG1hcnRfY29sb3JwaWNrZXIiLCJjc3NfYXJncyI6eyJjb2xvciI6WyIgLmluZm8tYm94LXRpdGxlIl19LCJzZWxlY3Rvcl9pZCI6IjYwODUyNDAzMWEzNWMiLCJkYXRhIjp7ImRlc2t0b3AiOiIjMjYyYzQ5In19" svg_animation="no" info_box_inline="no" el_class="ib-soc"][/woodmart_info_box][/vc_column_inner][/vc_row_inner][vc_row_inner el_class="myGoogleButton" row_reverse_mobile="0" row_reverse_tablet="0"][vc_column_inner][woodmart_title size="medium" woodmart_css_id="6085236343bd6" title="טכנולוגיה חדישה מאפשרת איתור נזילות מים בקיר ללא צורך בהרס" title_custom_color="eyJwYXJhbV90eXBlIjoid29vZG1hcnRfY29sb3JwaWNrZXIiLCJjc3NfYXJncyI6eyJjb2xvciI6WyIgLndvb2RtYXJ0LXRpdGxlLWNvbnRhaW5lciJdfSwic2VsZWN0b3JfaWQiOiI2MDg1MjM2MzQzYmQ2IiwiZGF0YSI6eyJkZXNrdG9wIjoiI2ZmZmZmZiJ9fQ==" title_width="100"][/vc_column_inner][/vc_row_inner][/vc_column][vc_column width="1/2"][/vc_column][/vc_row][vc_row full_width="stretch_row_content_no_spaces" mcw_fp_auto_height="on" el_class="fp-footer-insert" mobile_bg_img_hidden="no" tablet_bg_img_hidden="no" woodmart_parallax="0" woodmart_gradient_switch="no" row_reverse_mobile="0" row_reverse_tablet="0" woodmart_disable_overflow="0"][vc_column css=".vc_custom_1611497441301{padding-top: 0px !important;padding-right: 0px !important;padding-left: 0px !important;}" mobile_bg_img_hidden="no" tablet_bg_img_hidden="no" woodmart_parallax="0" woodmart_sticky_column="false" parallax_scroll="no" mobile_reset_margin="no" tablet_reset_margin="no"][/vc_column][/vc_row][vc_row disable_element="yes" mobile_bg_img_hidden="no" tablet_bg_img_hidden="no" woodmart_parallax="0" woodmart_gradient_switch="no" row_reverse_mobile="0" row_reverse_tablet="0" woodmart_disable_overflow="0"][vc_column][vc_btn title="ייעוץ והדרכת קבלני איטום" align="center" el_class="sl-btn sl-btn1"][vc_btn title="חוות דעת של מומחה" align="center" el_class="sl-btn sl-btn2" link="url:%2F%D7%A6%D7%95%D7%A8-%D7%A7%D7%A9%D7%A8%2F"][/vc_column][/vc_row]</p>
