.vc_custom_1623586369813{background-image: url(https://naty-insulation.co.il/wp-content/uploads/2021/06/long-shot-man-working-roof.jpg?id=3682) !important;background-position: center !important;background-repeat: no-repeat !important;background-size: cover !important;}.vc_custom_1623584153790{background-position: center !important;background-repeat: no-repeat !important;background-size: cover !important;}.vc_custom_1619338069636{background-image: url(https://naty-insulation.co.il/wp-content/uploads/2021/04/b92ebc8e-3907-4b7d-b147-0f40b9ea4aaf.jpg?id=3570) !important;background-position: center !important;background-repeat: no-repeat !important;background-size: cover !important;}.vc_custom_1623586341106{background-color: rgba(255,255,255,0.52) !important;*background-color: rgb(255,255,255) !important;}.vc_custom_1623587201704{margin-top: 100px !important;}.vc_custom_1618239253571{margin-bottom: 55px !important;}.vc_custom_1618239261787{margin-bottom: 55px !important;}.vc_custom_1618239269835{margin-bottom: 55px !important;}.vc_custom_1618239280882{margin-bottom: 55px !important;}.vc_custom_1615476445082{margin-bottom: 0px !important;}.vc_custom_1619076916482{padding-top: 0px !important;}.vc_custom_1619076481450{margin-bottom: 0px !important;}.vc_custom_1610982851048{margin-bottom: 50px !important;}.vc_custom_1611497441301{padding-top: 0px !important;padding-right: 0px !important;padding-left: 0px !important;}